SDAST meeting # 22 March 26th–27th 2002 Updates: all components

• TSTART and TSTOP keywords copied from SWG • Check DAL3GENattributeCopy used correctly • Chatty becomes Chatter • All unit test to have separate test data package • All unit tests to have environmental variables set • All unit test to conform to new format • Check all components use DALtableGetBuffSize NOT DALtableComputeBuffSize • All byte data buffers must ‘unsigned char’ • JEMX 1 → JMX1; JEMX 2 → JMX2 • makeUnique to be removed from all parameter files • CommonPreparePARSstrings always called with make- Unique=TRUE • No warnings should produce error messages Carol Anne Oxborrow

SDAST meeting # 22 March 26th–27th 2002

Individual components

j prp status table Version 2.1 delivered 12/06/01 (SPR 292) • Still needs to handle RATE and SPEC data • Add one-time loop to ‘save’ function for buffer tidy-up

j prp verify Add as much functionality as time allows

j calib gain fitting Has outstanding problems:

• Error messages for warnings (SPR 1060) • Ni doublet must be a singlet model • JMX2 needs an Fe-55 model • Need a Xe line model for JMX2 • Must be able to ignore rubbish/null data

j calib adc Changes in OBSW calibration procedure etc.:

Ignore all near-zero responses Input and output to be Index tables not individual data structures SPR 1108: don’t use DAL MED STRING for DOL strings j cor gain As well as above changes:

Need new time-varying model Must hand null or ‘bad’ coefficients Check how bins are identified

j cor position Some internal changes:

CORX and CORY tables to contain absolute positions in mm from centre (NJW to provide ‘NULL’ tables) Must have all the necessary override parameters Flag events in FRSS spillover area with certain energies?

j dead time calc Improve functionality:

• DEAD-MOD to contain deadtime per event at given rate • Dead time calculated according to number of events then converted to percent

Carol Anne Oxborrow